                        LOG FILE INFORMATION                                                                                            Log files may be used for saving information displayed in any of theChronology of History screens.  Information that may be saved to a  log file is denoted with a [Log] option at the bottom of the screen.                                                                    To open a log file, use the File menu and select the Open Log File  option.  The user will be prompted to enter a filename (8 charactersin length).  Only one log file may be opened at a time.  If the OpenLog File option is selected once a log file has already been opened,the currently opened log file will be closed and the user will be   prompted for a new filename.                                                                                                           To close a log file, use the File menu and select the Close Log Fileoption.  If the program is exited before the log file is closed, it will automatically be closed. The log file may be printed after the program is exited.                                                  